<script lang="ts" setup>

useSeoMeta({
  title: 'Litlyx - One-Line Code Lightweight Analytics | AI Powered Analytics Dashboard',
  ogTitle: 'Litlyx - One-Line Code Lightweight Analytics | AI Powered Analytics Dashboard',
  description: 'Track over 10 KPIs effortlessly with Litlyx. One line of code, open-source, lightweight, custom events, AI Data-Analyst at your service and affordable. Start for free!',
  ogDescription: 'Track over 10 KPIs effortlessly with Litlyx. One line of code, open-source, lightweight, custom events, AI Data-Analyst at your service and affordable. Start for free!',
  keywords: 'Litlyx, analytics tracking, real-time analytics, open-source analytics, minimal setup, KPI tracking, one line of code, high customization, AI data analyst assistant, report generation, user-friendly analytics, business intelligence, data visualization, performance metrics, customizable dashboards, data insights, seamless integration, powerful analytics',
  author: 'Litlyx',
  ogImage: 'https://litlyx.com/ogimage.jpg',
  ogType: 'website',
  ogUrl: 'https://litlyx.com',
  twitterCard: 'summary_large_image',
  twitterTitle: 'Litlyx - One-Line Code Lightweight Analytics | AI Powered Analytics Dashboard',
  twitterDescription: 'Track over 10 KPIs effortlessly with Litlyx. One line of code, open-source, lightweight, custom events, AI Data-Analyst at your service and affordable. Start for free!',
  twitterImage: 'https://litlyx.com/ogimage.jpg',
  ogSiteName: 'Litlyx',
  ogLocale: 'en_US',
  ogImageWidth: '1200',
  ogImageHeight: '630'
});


</script>

<template>

  <div class="w-dvw h-dvh bg-[#151517]">
    <NuxtLayout>
      <NuxtPage></NuxtPage>
    </NuxtLayout>
  </div>

</template>
